-- MySQL dump honeypot
-- This is a fake file designed to detect scanners
--
-- Server version: 8.0.0

CREATE DATABASE IF NOT EXISTS `honeypot`;
USE `honeypot`;

CREATE TABLE `users` (
  `id` int NOT NULL AUTO_INCREMENT,
  `username` varchar(255),
  `password` varchar(255),
  PRIMARY KEY (`id`)
);

INSERT INTO `users` VALUES (1, 'admin', 'HONEYPOT_FAKE_PASSWORD');
